%
% general configuration
%

\usepackage[draft=false]{scrlayer-scrpage}
\usepackage{ifdraft}
\renewcommand*{\chaptermarkformat}{\MakeUppercase{\chapapp}~\thechapter\autodot\enskip}
\chead{}
%\chead*{Entwicklungsversion \version}
\ihead{\headmark}
\ohead{\pagemark}

% Use microtype to improve typesetting
\usepackage{microtype}

%set page margin for DIN A4
\geometry{a4paper, left=2.5cm, right=2.5cm, top=4cm, 
          bottom=5cm, bindingoffset=1cm}

%makes TeX less fussy about line breaking
          % but makes it also look like Word
%\sloppy

% Replacement for changing parskip and parindent directly
%\usepackage{parskip}

%1.5 spacing
\onehalfspacing
{}


%define some colors
\definecolor{darkblue}{rgb}{0.0,0.0,0.5}
\definecolor{grey}{rgb}{0.8,0.8,0.8}
\definecolor{lightgrey}{rgb}{0.95,0.95,0.95}


%override reference title and listings title
\renewcommand \bibname{References}
%\renewcommand{\lstlistlistingname}{List of Listings}

\newtheorem{definition}{Definition}
